80˚ 80˚

90˚ 90˚

100˚

100˚

110˚

110˚

120˚

120˚

130˚

130˚

20˚

20˚

30˚

30˚

40˚

40˚

M scale5 6 7 8 Depth<50km Depth>=50km and <200km Depth>=200km Historic earthquake

80˚ 80˚

85˚ 85˚

90˚ 90˚

95˚ 95˚

35˚

35˚

40˚

40˚

M scale 5 6 7 8_{Historic earthquake}